      \fitem{sample}{nim, p:numeric} build a new nim with linear
      interpolation type by sampling each component at \code{p} points
      equally spaced between the first and the last breakpoint. See
      p.~\pageref{fct:sample} and function \acode{linearize} and
      \acode{align_breakpoints}. 


      %%% -------------------------------------------------------

