      \fitem{align_breakpoints}(nim) returns a nim with linear
      interpolation type whose (homogeneous) breakpoints are the
      breakpoints of all components of the arguments. See
      p.~\pageref{fct:sample} and function \acode{sample} and
      \acode{linearize}.

      %%% -------------------------------------------------------

